a) Horizontal wavenumber (1/km)

Vertical wavenumber (1/km)

-20 -10 0 10 20 -60 -40 -20 0 20 40

b) Horizontal wavenumber (1/km)

-20 -10 0 10 20

0.2 0.4 0.6 0.8 1