Table 1.

Problem {q_i} {n_i} {d_i} Description of feasible set Density from {ω_i} — d_1 = ρ Finite, nonconvex, bounded string vibration region near the origin

Wave slowness from {τ_i} n_1 = s — Infinite, convex, bounded traveltime tomography away from the origin

Elastic constants from {ω_i} n_1 = κ d_1 = ρ Infinite cone, nonconvex free oscillations n_2 = μ