SVD and the Generalized Inverse

The singular value decomposition of the generalized inverse X is X = M^† = V Σ^†U^T , where the symbol^† means generalized or pseudoinverse and the generalized inverse of Σ is given by the diagonal n × m matrix of the inverses of all the nonzero singular values σ_i, while the remaining diagonal entries are zero.