Snell’s Law^� of Refraction

Statement from Jenkins and White:

The refracted ray lies in the plane of incidence, and the sine of the angle of refraction bears a constant ratio to the sine of the angle of incidence.

�Willebrord Snell (1591{1626) announced this law in an unpublished paper in 1621.