Statement of Snell’s Law θ_i is the angle of incidence θ_r is the angle of refraction N is the physical constant called the \index of refraction," a real number greater than 1.

N = 1 for vacuum and N ’ 1 for air.

Then, for light entering a refracting medium from air: sin θ_i = N � sin θ_r